Title: Test Accordion Problem

test

Using Moodle 4.5.12 and Interactive book 1.15

Seem to have issues opening accordions. Whenever one is opened, it jumps a few px to the left and then back. It also brings up the scroll bar

First noticed this in a row with accordions, but happens to any accordion it seems

Happens at all zoom levels, i have tried. A previous similar problem with the jumping around was resolved by sitting at 100% zoom but this did not fix it here.

I usually embed these interactive books on pages, and that is where the jumping left behaviour is appearing, which i have put a video of on the 2nd next page.

when simply opened in the editor, i just notice that the scroll bar appears, as if the page is auto resizing because the accordion is opened. the video on next page is of that behaviour. i created this h5p in content bank of my moodle site.

click me

lorem ipsum etc etc

test

test

test

test

videos

in editor at 67% zoom

in editor at 100% zoom

videos on page

on a page, in the editor